From 271e31c629be2dff93d68e01c9a8a9c5c34b7e2c Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Mon, 2 Jan 2017 14:20:15 +0100
Subject: Various fixes and tweaks to the user guide

---
 doc/src/guide/flow_diagram.asciidoc | 8 ++++++++
 1 file changed, 8 insertions(+)

(limited to 'doc/src/guide/flow_diagram.asciidoc')

diff --git a/doc/src/guide/flow_diagram.asciidoc b/doc/src/guide/flow_diagram.asciidoc
index 1095404..ad2110d 100644
--- a/doc/src/guide/flow_diagram.asciidoc
+++ b/doc/src/guide/flow_diagram.asciidoc
@@ -2,3 +2,11 @@
 == Flow diagram
 
 Placeholder chapter.
+
+Cowboy 2.0 has changed the request flow and general architecture.
+You can read about the Cowboy 1.0 architecture and flow here:
+
+* xref:architecture[Architecture]
+* xref:overview[Overview]
+
+This chapter will be updated in a future pre-release.
-- 
cgit v1.2.3

