From f810d8dd6496da713e7c70a5e146120de3695774 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Fri, 21 Sep 2018 14:04:20 +0200
Subject: Add the {active, boolean()} Websocket command

This command is currently not documented. It allows disabling
the reading of incoming data from the socket, and can be used
as a poor man's flow control.
---
 doc/src/guide/migrating_from_2.4.asciidoc | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'doc/src/guide/migrating_from_2.4.asciidoc')

diff --git a/doc/src/guide/migrating_from_2.4.asciidoc b/doc/src/guide/migrating_from_2.4.asciidoc
index edf7d5b..0528659 100644
--- a/doc/src/guide/migrating_from_2.4.asciidoc
+++ b/doc/src/guide/migrating_from_2.4.asciidoc
@@ -31,6 +31,10 @@ also been worked on.
   sent or commands yet to be introduced. New commands will
   be available only through this new interface.
 
+* Add the `{active, boolean()}` Websocket handler command.
+  It allows disabling reading from the socket when `false`
+  is returned. `true` reenables reading from the socket.
+
 * Add the protocol option `logger` that allows configuring
   which logger module will be used. The logger module must
   follow the interface of the new `logger` module in Erlang/OTP 21,
-- 
cgit v1.2.3

