From 73b4eb94ff8c5bf98b3e2faae22ee207c234bb38 Mon Sep 17 00:00:00 2001
From: Gary Rennie <gazler@gmail.com>
Date: Thu, 6 Apr 2017 10:35:58 +0100
Subject: Update Websocket handler docs default timeout

This was changed from infinity to 60s in
a45813c60f0f983a24ea29d491b37f0590fdd087
---
 doc/src/guide/ws_handlers.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/src/guide/ws_handlers.asciidoc')

diff --git a/doc/src/guide/ws_handlers.asciidoc b/doc/src/guide/ws_handlers.asciidoc
index 2c38b87..61a523b 100644
--- a/doc/src/guide/ws_handlers.asciidoc
+++ b/doc/src/guide/ws_handlers.asciidoc
@@ -220,7 +220,7 @@ init(Req, State) ->
 ----
 
 This value cannot be changed once it is set. It defaults to
-`infinity`.
+`60000`.
 
 // @todo Perhaps the default should be changed.
 
-- 
cgit v1.2.3

