From 7373822b8645f34c03a7bf522ea170c62817d8e8 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Wed, 25 Apr 2018 21:32:58 +0200
Subject: Add the max_concurrent_streams h2 option

---
 doc/src/manual/cowboy_http2.asciidoc | 8 +++++++-
 1 file changed, 7 insertions(+), 1 deletion(-)

(limited to 'doc/src/manual/cowboy_http2.asciidoc')

diff --git a/doc/src/manual/cowboy_http2.asciidoc b/doc/src/manual/cowboy_http2.asciidoc
index 5ce809a..4c47fea 100644
--- a/doc/src/manual/cowboy_http2.asciidoc
+++ b/doc/src/manual/cowboy_http2.asciidoc
@@ -21,6 +21,7 @@ opts() :: #{
     enable_connect_protocol => boolean(),
     env                     => cowboy_middleware:env(),
     inactivity_timeout      => timeout(),
+    max_concurrent_streams  => non_neg_integer() | infinity,
     max_decode_table_size   => non_neg_integer(),
     max_encode_table_size   => non_neg_integer(),
     middlewares             => [module()],
@@ -55,6 +56,9 @@ env (#{})::
 inactivity_timeout (300000)::
     Time in ms with nothing received at all before Cowboy closes the connection.
 
+max_concurrent_streams (infinity)::
+    Maximum number of concurrent streams allowed on the connection.
+
 max_decode_table_size (4096)::
     Maximum header table size used by the decoder. This is the value advertised
     to the client. The client can then choose a header table size equal or lower
@@ -79,7 +83,9 @@ stream_handlers ([cowboy_stream_h])::
 
 == Changelog
 
-* *2.4*: Add the options `max_decode_table_size` and `max_encode_table_size`.
+* *2.4*: Add the options `max_concurrent_streams`,
+         `max_decode_table_size` and `max_encode_table_size`
+         to configure HTTP/2 SETTINGS.
 * *2.4*: Add the experimental option `enable_connect_protocol`.
 * *2.0*: Protocol introduced.
 
-- 
cgit v1.2.3

