From b56a5a1d60715ae115723c11c27ff7e032a3c4a5 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Wed, 12 Sep 2018 16:16:29 +0200
Subject: Do not send a 101 after a final response in switch_protocol

---
 doc/src/manual/cowboy_stream.asciidoc | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'doc/src/manual/cowboy_stream.asciidoc')

diff --git a/doc/src/manual/cowboy_stream.asciidoc b/doc/src/manual/cowboy_stream.asciidoc
index 763cbd5..4e6e34a 100644
--- a/doc/src/manual/cowboy_stream.asciidoc
+++ b/doc/src/manual/cowboy_stream.asciidoc
@@ -205,6 +205,9 @@ Contains the headers that will be sent in the 101 response,
 along with the module implementing the protocol we are
 switching to and its initial state.
 
+Note that the 101 informational response will not be sent
+after a final response.
+
 === stop
 
 Stop the stream.
-- 
cgit v1.2.3

