[[flow_diagram]]
== Flow diagram

Placeholder chapter.

Cowboy 2.0 has changed the request flow and general architecture.
You can read about the Cowboy 1.0 architecture and flow here:

* xref:architecture[Architecture]
* xref:overview[Overview]

This chapter will be updated in a future pre-release.
