From e78e76c701c4554295ddfd6083b7aa54a378c6a9 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Wed, 28 Nov 2018 15:10:54 +0100
Subject: Rename the rel/ directory to config/ by default

---
 doc/src/guide/eunit.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/src/guide/eunit.asciidoc')

diff --git a/doc/src/guide/eunit.asciidoc b/doc/src/guide/eunit.asciidoc
index 496b674..41e26e3 100644
--- a/doc/src/guide/eunit.asciidoc
+++ b/doc/src/guide/eunit.asciidoc
@@ -65,7 +65,7 @@ to be passed to `erl` when running EUnit tests. For example,
 you can load the 'vm.args' and 'sys.config' files:
 
 [source,make]
-EUNIT_ERL_OPTS = -args_file rel/vm.args -config rel/sys.config
+EUNIT_ERL_OPTS = -args_file config/vm.args -config config/sys.config
 
 === Usage
 
-- 
cgit v1.2.3

