From e0ebd0a1f395dc8b9813b490fc7b0104942f0927 Mon Sep 17 00:00:00 2001
From: derwinlu <derwinlu+git@gmail.com>
Date: Mon, 23 Jan 2017 15:48:41 +0100
Subject: Fix Archlinux Installation Instructions

Suggesting -Sy is a terrible idea[1]. This commit replaces it with -S
which is the default on how packages should be added on Archlinux.

Resolves #662.

[1]: https://bbs.archlinux.org/viewtopic.php?id=89328
---
 doc/src/guide/installation.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/src/guide/installation.asciidoc')

diff --git a/doc/src/guide/installation.asciidoc b/doc/src/guide/installation.asciidoc
index f3a52cf..a1e5fd3 100644
--- a/doc/src/guide/installation.asciidoc
+++ b/doc/src/guide/installation.asciidoc
@@ -22,7 +22,7 @@ The commands to install packages vary between distributions:
 
 .Arch Linux
 [source,bash]
-$ pacman -Sy erlang git make
+$ pacman -S erlang git make
 
 ==== FreeBSD
 
-- 
cgit v1.2.3

