From d3c5885b7463f3019efdf2ee1fd9cdf7d85396fe Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Fri, 5 Jan 2018 21:58:55 +0100
Subject: Implement SDL_GetPlatform to get one more header done

---
 README.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.asciidoc')

diff --git a/README.asciidoc b/README.asciidoc
index a52dc35..dbd6943 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -15,6 +15,7 @@ corresponding to the public headers.
 * 'SDL_keyboard.h'
 * 'SDL_keycode.h'
 * 'SDL_mouse.h'
+* 'SDL_platform.h'
 * 'SDL_power.h'
 * 'SDL_scancode.h'
 
@@ -154,7 +155,6 @@ corresponding to the public headers.
 * 'SDL_joystick.h'
 * 'SDL_messagebox.h'
 * 'SDL_pixels.h'
-* 'SDL_platform.h'
 * 'SDL_rwops.h' (unclear if we need it)
 * 'SDL_shape.h'
 * 'SDL_system.h'
-- 
cgit v1.2.3

