From 2c8db0879109dd90443d7b276e5ca2daf83920bc Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Thu, 20 Aug 2020 16:06:59 +0200
Subject: Rename the 3-arity gun_socks_up to gun_tunnel_up

---
 doc/src/manual/gun_up.asciidoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'doc/src/manual/gun_up.asciidoc')

diff --git a/doc/src/manual/gun_up.asciidoc b/doc/src/manual/gun_up.asciidoc
index db09fca..3853afd 100644
--- a/doc/src/manual/gun_up.asciidoc
+++ b/doc/src/manual/gun_up.asciidoc
@@ -21,7 +21,7 @@ reconnection completed.
 
 If Gun is configured to connect to a Socks server, then the
 connection is not usable yet. One or more
-link:man:gun_socks_up(3)[gun_socks_up(3)] messages will follow.
+link:man:gun_tunnel_up(3)[gun_tunnel_up(3)] messages will follow.
 
 Otherwise, Gun will start processing the messages it received while
 waiting for the connection to be up. If this is a reconnection,
@@ -61,6 +61,6 @@ link:man:gun(3)[gun(3)],
 link:man:gun:open(3)[gun:open(3)],
 link:man:gun:open_unix(3)[gun:open_unix(3)],
 link:man:gun:await_up(3)[gun:await_up(3)],
-link:man:gun_socks_up(3)[gun_socks_up(3)],
+link:man:gun_tunnel_up(3)[gun_tunnel_up(3)],
 link:man:gun_down(3)[gun_down(3)],
 link:man:gun_error(3)[gun_error(3)]
-- 
cgit v1.2.3

