= gun:open_unix(3)

== Name

gun:open_unix - Open a connection to the given Unix domain socket

== Description

[source,erlang]
----
open_unix(SocketPath, Opts) -> {ok, pid()} | {error, any()}

SocketPath :: string()
Opts       :: gun:opts()
----

Open a connection to the given Unix domain socket.

== Arguments

SocketPath::

Path to the Unix domain socket to connect to.

Opts::

Options for this connection.

== Return value

The pid of the newly created Gun process is returned.
Note that this does not indicate that the connection
has been successfully opened; the link:man:gun_up(3)[gun_up(3)]
message will be sent for that.

== Changelog

* *1.0*: Function introduced.

== Examples

.Connect to a server via a Unix domain socket
[source,erlang]
----
{ok, ConnPid} = gun:open_unix("/var/run/dbus/system_bus_socket", #{}).
----

.Connect to a server via a Unix domain socket with custom options
[source,erlang]
----
{ok, ConnPid} = gun:open_unix("/var/run/dbus/system_bus_socket",
    #{protocols => [http2]}).
----

== See also

link:man:gun(3)[gun(3)],
link:man:gun:open(3)[gun:open(3)],
link:man:gun:await_up(3)[gun:await_up(3)],
link:man:gun_up(3)[gun_up(3)]
