= gun:set_owner(3)

== Name

gun:set_owner - Set a new owner for the connection

== Description

[source,erlang]
----
set_owner(ConnPid, OwnerPid) -> ok

ConnPid  :: pid()
OwnerPid :: pid()
----

Set a new owner for the connection.

Only the current owner of the connection can set a new
owner.

Gun monitors the owner of the connection and automatically
shuts down gracefully when the owner exits.

== Arguments

ConnPid::

The pid of the Gun connection process.

OwnerPid::

The pid of the new owner for the connection.

== Return value

The atom `ok` is returned.

== Changelog

* *2.0*: Function introduced.

== Examples

.Set a new owner for the connection
[source,erlang]
----
ok = gun:set_owner(ConnPid, OwnerPid).
----

== See also

link:man:gun(3)[gun(3)],
link:man:gun:open(3)[gun:open(3)],
link:man:gun:open_unix(3)[gun:open_unix(3)],
link:man:gun:shutdown(3)[gun:shutdown(3)],
link:man:gun:close(3)[gun:close(3)]
