= gun_up(3)

== Name

gun_up - The connection is up

== Description

[source,erlang]
----
{gun_up, ConnPid, Protocol}

ConnPid  :: pid()
Protocol :: http | http2 | socks
----

The connection is up.

This message informs the owner process that the connection or
reconnection completed.

If Gun is configured to connect to a Socks server, then the
connection is not usable yet. One or more
link:man:gun_socks_up(3)[gun_socks_up(3)] messages will follow.

Otherwise, Gun will start processing the messages it received while
waiting for the connection to be up. If this is a reconnection,
then this may not be desirable for all requests. Those requests
should be cancelled when the connection goes down, and any
subsequent messages ignored.

== Elements

ConnPid::

The pid of the Gun connection process.

Protocol::

The protocol selected for this connection. It can be used
to determine the capabilities of the server.

== Changelog

* *1.0*: Message introduced.

== Examples

.Receive a gun_up message in a gen_server
[source,erlang]
----
handle_info({gun_up, ConnPid, _Protocol},
            State=#state{conn_pid=ConnPid}) ->
    %% Do something.
    {noreply, State}.
----

== See also

link:man:gun(3)[gun(3)],
link:man:gun:open(3)[gun:open(3)],
link:man:gun:open_unix(3)[gun:open_unix(3)],
link:man:gun:await_up(3)[gun:await_up(3)],
link:man:gun_socks_up(3)[gun_socks_up(3)],
link:man:gun_down(3)[gun_down(3)],
link:man:gun_error(3)[gun_error(3)]
