From d4432fac6837f22ebaf8c1b1c903ff1b94f6c7dc Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Fri, 15 Jan 2016 17:50:34 +0100
Subject: Fix the lfe-shell command in the README

---
 README.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.asciidoc')

diff --git a/README.asciidoc b/README.asciidoc
index b35f2fa..b21ed58 100644
--- a/README.asciidoc
+++ b/README.asciidoc
@@ -14,4 +14,4 @@ include erlang.mk
 The command `make` will compile all LFE files in the 'src/'
 directory.
 
-The command `lfe-shell` will open an LFE shell.
+The command `make lfe-shell` will open an LFE shell.
-- 
cgit v1.2.3

