From 41c769ab5c19da92ecba35d9accc4bc123029e8d Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lo=C3=AFc=20Hoguin?= <essen@ninenines.eu>
Date: Tue, 23 May 2017 20:47:46 +0200
Subject: Remove the use of bootstrap-carousel

The custom.js file was converted to not use jquery also. Once
bootstrap is gone, we can remove jquery entirely.
---
 docs/en/gun/1.0/guide/websocket.asciidoc | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'docs/en/gun/1.0/guide/websocket.asciidoc')

diff --git a/docs/en/gun/1.0/guide/websocket.asciidoc b/docs/en/gun/1.0/guide/websocket.asciidoc
index 4869a2e4..f99dea70 100644
--- a/docs/en/gun/1.0/guide/websocket.asciidoc
+++ b/docs/en/gun/1.0/guide/websocket.asciidoc
@@ -64,6 +64,10 @@ after 1000 ->
 	exit(timeout)
 end.
 
+Note that you shouldn't use the `reply_to` request option
+for connections you plan to upgrade, because only the
+owner of the connection will receive messages about it.
+
 === Sending data
 
 Once the Websocket upgrade has completed successfully, you no
-- 
cgit v1.2.3

