From eeb332cff86912f58daf247ba53ffe9b43e36128 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Jo=C3=A3o=20Henrique=20Ferreira=20de=20Freitas?=
 <joaohf@gmail.com>
Date: Tue, 5 May 2020 20:48:09 +0200
Subject: Fix the correct number and description of Protocol:start_link/3
 function

---
 doc/src/guide/protocols.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/src/guide/protocols.asciidoc')

diff --git a/doc/src/guide/protocols.asciidoc b/doc/src/guide/protocols.asciidoc
index b455143..73a0bf5 100644
--- a/doc/src/guide/protocols.asciidoc
+++ b/doc/src/guide/protocols.asciidoc
@@ -8,7 +8,7 @@ protocol logic executed in this process.
 All protocol handlers must implement the `ranch_protocol` behavior
 which defines a single callback, `start_link/3`. This callback is
 responsible for spawning a new process for handling the connection.
-It receives four arguments: the name of the listener, the socket, the
+It receives three arguments: the name of the listener, the
 transport handler being used and the protocol options defined in
 the call to `ranch:start_listener/5`. This callback must
 return `{ok, Pid}`, with `Pid` the pid of the new process.
-- 
cgit v1.2.3

